目錄

簡介

必要條件

需求

採用元件

慣例

拓撲

構建四節點RPR

驗證

步驟1

步驟2

步驟3

步驟4

相關資訊

簡介

本檔案介紹在Cisco ONS 15454上透過多層(ML)卡以四個節點建立彈性封包環(RPR)的組態。

必要條件

需求

思科建議您瞭解以下主題：

- Cisco ONS 15454

- 思科ONS 15454 ML系列乙太網卡

- Cisco IOS®軟體

- 橋接和IP路由

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 運行ONS版本5.02的Cisco ONS 15454

- 運行Cisco IOS軟體版本12.2的ML（作為ONS 5.02版本的一部分捆綁）。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

拓撲

本文檔使用具有四個ONS 15454節點的實驗室設定，即Studio Node 1、Studio Node 2、Studio Node 3和Studio Node 4(請參見圖1)。 這四個節點組成一個OC48單向路徑交換環(UPSR)。

註：為了便於理解，本文檔的其餘部分將這些節點稱為節點1、節點2、節點3和節點4。

圖1 — 拓撲

每個節點在插槽6中安裝了一個ML 100T卡(請參見圖2)。

圖2 — 節點檢視：插槽6中的ML 100T卡

圖3顯示了RPR環拓撲。RPR設定基於此拓撲。

圖3 - RPR環拓撲

構建四節點RPR

完成以下步驟，構建具有四個節點的RPR:

1. 在節點1上的POS 1和節點2上的POS 0之間建立電路。

請完成以下步驟：

1. 選擇Circuit > Create。

將出現「電路建立」(Circuit Creation)對話方塊：

圖4 — 電路建立

2. 選擇STS，然後按一下Next。

出現「Circuit Attributes（電路屬性）」視窗(請參見圖5)。

3. 在Name欄位中鍵入電路名稱。

圖5 - 「Circuit Attributes（電路屬性）」視窗

4. 從「大小」清單中選擇電路的相關大小，從「狀態」清單中選擇相應的狀態。

5. 按「Next」（下一步）。

出現「Source（來源）」視窗(請參見Figure 6)。

6. 從「節點」清單中選擇Studio節點1作為源節點。

7. 從Slot清單中選擇6(ML100T)，然後從Port清單中選擇1(POS)。

注意：始終從pos 0到pos 1開始振鈴。

圖6 — 源視窗

8. 按「Next」（下一步）。

出現「Destination（目標）」視窗(請參見圖7)。

9. 從「節點」清單中選擇Studio節點2作為目標節點。

10. 從Slot清單中選擇6(ML100T)，然後從Port清單中選擇1(POS)。

圖7 — 目標視窗

11. 按「Next」（下一步）。

出現「Circuit Routing Preferences（電路佈線首選項）」視窗(請參見圖8)。

取消選中Fully Protected Path覈取方塊，因為保護由RPR執行。您可以選中Route Automatically或手動路由電路。如果選擇手動路由，請轉至步驟m。

12. 取消選中完全保護路徑覈取方塊。

圖8 — 電路路由首選項視窗

13. 按「Next」（下一步）。

出現「Route Review/Edit（路由檢視/編輯）」視窗(請參見圖9)。

14. 選擇源節點，然後按一下Add Span。

15. 按一下「Finish」（結束）。

電路建立完成。圖9顯示了節點1上的POS 1和節點2上的POS 0之間的電路。

圖9 — 節點1上的POS1和節點2上的POS0之間的電路

2. 在節點2上的POS 1和節點3上的POS 0之間建立電路。

使用步驟1中介紹的相同詳細步驟。圖10顯示了節點2上的POS 1和節點3上的POS 0之間的電路。

圖10 — 節點2上的POS 1與節點3上的POS 0之間的電路

3. 同樣，在節點3上的POS 1和節點4上的POS 0之間建立電路。

使用步驟1中介紹的相同詳細步驟。圖11顯示了節點3上的POS 1和節點4上的POS 0之間的電路。

圖11 — 節點3上的POS 1與節點4上的POS 0之間的電路

4. 最後，在節點4的POS 1和節點1的POS 0之間建立電路。

使用步驟1中介紹的相同詳細步驟。圖12顯示了節點4上的POS 1和節點1上的POS 0之間的電路。

圖12 — 節點4上的POS 1到節點1上的POS 0之間的電路

5. 在節點1上配置ML100T卡。

請完成以下步驟：

1. 啟用整合橋接和路由(IRB)。

bridge irb

2. 配置SRP介面：

interface SPR1

ip address 10.1.1.1 255.0.0.0

carrier-delay msec 50

no keepalive

spr station-id 1

spr wrap delayed

hold-queue 150 in

3. 配置介面POS0:

interface POS0

no ip address

carrier-delay msec 50

spr-intf-id 1

crc 32

4. 配置介面POS1:

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

6. 在節點2上配置ML100T卡。

請完成以下步驟：

1. 啟用整合橋接和路由(IRB)。

bridge irb

2. 配置SRP介面：

interface SPR1

ip address 10.1.1.2 255.0.0.0

carrier-delay msec 50

no keepalive

spr station-id 2

spr wrap delayed

hold-queue 150 in

3. 配置介面POS0:

interface POS0

no ip address

carrier-delay msec 50

spr-intf-id 1

crc 32

4. 配置介面POS1:

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

7. 在節點3上配置ML100T卡。

請完成以下步驟：

1. 啟用整合橋接和路由(IRB)。

bridge irb

2. 配置SRP介面：

interface SPR1

ip address 10.1.1.3 255.0.0.0

carrier-delay msec 50

no keepalive

spr station-id 3

spr wrap delayed

hold-queue 150 in

3. 配置介面POS0:

interface POS0

no ip address

carrier-delay msec 50

spr-intf-id 1

crc 32

4. 配置介面POS1:

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

8. 在節點4上配置ML100T卡。

請完成以下步驟：

1. 啟用整合橋接和路由(IRB)。

bridge irb

2. 配置SRP介面：

interface SPR1

ip address 10.1.1.4 255.0.0.0

carrier-delay msec 50

no keepalive

spr station-id 4

spr wrap delayed

hold-queue 150 in

3. 配置介面POS0:

interface POS0

no ip address

carrier-delay msec 50

spr-intf-id 1

crc 32

4. 配置介面POS1:

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

驗證

若要驗證設定，您必須從其他每個節點成功ping通每個節點。本部分提供了逐步驗證過程，以確保配置是正確的。

步驟1

請完成以下步驟：

1. 從節點1對節點2、節點3和節點4執行ping:

Node_1_Slot_6#ping 10.1.1.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/11/32 ms

Node_1_Slot_6#ping 10.1.1.3

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/8/24 ms

Node_1_Slot_6#ping 10.1.1.4

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.4, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/5/8 ms

2. 發出show cdp neighbor命令。

Node_1_Slot_6#show cdp neighbor

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone

Device ID       Local Intrfce    Holdtme   Capability  Platform  Port ID

Node_4_Slot_6   SPR1              137          R       ONS-ML100TSPR1

Node_3_Slot_6   SPR1              162         R T      ONS-ML100TSPR1

Node_2_Slot_6   SPR1              128          R       ONS-ML100TSPR1

步驟2

接下來，請完成以下步驟：

1. 從節點2成功ping節點1、節點3和節點4。

Node_2_Slot_6#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/6/12 ms

Node_2_Slot_6#ping 10.1.1.3

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/8 ms

Node_2_Slot_6#ping 10.1.1.4

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.4, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/8 ms

2. 發出show cdp neighbor命令。

Node_2_Slot_6#show cdp neighbor

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone

Device ID       Local Intrfce    Holdtme   Capability  Platform  Port ID

Node_4_Slot_6   SPR1              175          R       ONS-ML100TSPR1

Node_1_Slot_6   SPR1              171         R T      ONS-ML100TSPR1

Node_3_Slot_6   SPR1              141         R T      ONS-ML100TSPR1

步驟3

請完成以下步驟：

1. 從節點3成功ping節點1、節點2和節點4。

Node_3_Slot_6#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/8/12 ms

Node_3_Slot_6#ping 10.1.1.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/5/12 ms

Node_3_Slot_6#ping 10.1.1.4

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.4, timeout is 2 seconds:

!!!!!

Success rate is 80 percent (4/5), round-trip min/avg/max = 4/5/8 ms

2. 發出show cdp neighbor命令。

Node_3_Slot_6#show cdp neighbor

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone

Device ID       Local Intrfce    Holdtme   Capability  Platform  Port ID

Node_4_Slot_6   SPR1              170          R       ONS-ML100TSPR1

Node_1_Slot_6   SPR1              166         R T      ONS-ML100TSPR1

Node_2_Slot_6   SPR1              161          R       ONS-ML100TSPR1

步驟4

最後，請完成以下步驟：

1. 從節點4成功ping節點1、節點2和節點3。

Node_4_Slot_6#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/6/12 ms

Node_4_Slot_6#ping 10.1.1.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/5/8 ms

Node_4_Slot_6#ping 10.1.1.3

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/6/12 ms

2. 發出show cdp neighbor命令。

Node_4_Slot_6#show cdp neighbor

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone

Device ID       Local Intrfce    Holdtme   Capability  Platform  Port ID

Node_1_Slot_6   SPR1              152         R T      ONS-ML100TSPR1

Node_3_Slot_6   SPR1              122         R T      ONS-ML100TSPR1

Node_2_Slot_6   SPR1              147          R       ONS-ML100TSPR1

相關資訊

- 技術支援與文件 - Cisco Systems