目錄

簡介

開始之前

慣例

必要條件

採用元件

設定

網路圖表

組態

驗證

疑難排解

相關資訊

簡介

此示例配置顯示了帶有節點路由處理器(NRP)介面卡的思科6400通用接入集中器(UAC)。提供了點對點和多點NRP配置的示例。兩台配置有非同步傳輸模式點對點協定(PPPoA)(aal5mux ppp)的Cisco 827數字使用者線路(DSL)路由器在Cisco 6400上終止。

還提供了Cisco 6130數字使用者線接入複用器(DSLAM)NI2和Cisco 6400節點交換處理器(NSP)的配置。

開始之前

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

必要條件

本文件沒有特定先決條件。

採用元件

本檔案中的資訊是根據以下軟體和硬體版本。

- 思科827-4V客戶端裝置(CPE)IOS®軟體版本12.1(1)XB

- Cisco 6400 UAC-NRP IOS軟體版本12.0(7)DC

- Cisco 6400 UAC-NSP IOS軟體版本12.0(4)DB

- Cisco 6130 DSLAM-NI2 IOS軟體版本12.1(1)DA

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您在即時網路中工作，請確保在使用任何命令之前瞭解其潛在影響。

設定

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

網路圖表

本文檔使用下圖所示的網路設定。

組態

本文檔使用如下所示的配置。

- 思科827路由器(R1)

- 思科827路由器(R2)

- Cisco 6130-NI2 DSLAM

- Cisco 6400 NSP

- 使用點對點介面的Cisco 6400-NRP

- 使用多點介面的Cisco 6400 NRP

思科827路由器(R1)

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname R1

!

ip subnet-zero

!

interface Ethernet0

no ip address

no ip directed-broadcast

!

interface ATM0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

pvc 3/100

encapsulation aal5mux ppp dialer

dialer pool-member 1

!

bundle-enable

hold-queue 224 in

!

interface Dialer0

ip address 172.18.0.1 255.255.0.0

no ip directed-broadcast

encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication chap callin

ppp chap hostname <hostname1>

ppp chap password <password1>

!

ip classless

ip route 0.0.0.0 0.0.0.0 Dialer0

no ip http server

!

dialer-list 1 protocol ip permit

!

voice-port 1

timing hookflash-in 0

!

voice-port 2

timing hookflash-in 0

!

voice-port 3

timing hookflash-in 0

!

voice-port 4

timing hookflash-in 0

!

end

思科827路由器(R2)

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname R2

!

ip subnet-zero

!

interface Ethernet0

no ip address

no ip directed-broadcast

!

interface ATM0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

PVC 4/100

encapsulation aal5mux ppp dialer

dialer pool-member 1

!

bundle-enable

hold-queue 224 in

!

interface Dialer0

ip address 172.18.0.2 255.255.0.0

no ip directed-broadcast

encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication chap callin

ppp chap hostname <hostname2>

ppp chap password <password2>

!

ip classless

ip route 0.0.0.0 0.0.0.0 Dialer0

!

dialer-list 1 protocol ip permit

!

voice-port 1

timing hookflash-in 0

!

voice-port 2

timing hookflash-in 0

!

voice-port 3

timing hookflash-in 0

!

voice-port 4

timing hookflash-in 0

!

end

Cisco 6130-NI2 DSLAM

ni2#

Current configuration:

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname ni2

!

slot 1 ATUC-1-4DMT

slot 2 ATUC-4FLEXIDMT

slot 13 ATUC-4FLEXIDMT

!

dsl-profile default

dmt training-mode quick

ip subnet-zero

!

ATM address 47.0091.8100.0000.0075.2b3f.4d01.0075.2b3f.4d01.00

ATM router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute ATM-static

!

interface ATM0/0

no ip address

ATM cac service-category abr deny

ATM maxvp-number 0

ATM maxvc-number 4096

ATM maxvci-bits 12

!

interface Ethernet0/0

no ip route-cache

!

interface ATM0/1

no ip address

ATM ilmi-keepalive

!

interface ATM0/2

no ip address

no ATM ilmi-keepalive

!

interface ATM1/1

no ip address

no ATM ilmi-keepalive

!

interface ATM1/2

no ip address

no ATM ilmi-keepalive

!

interface ATM1/3

no ip address

no ATM ilmi-keepalive

ATM PVC 3 100  interface  ATM0/1 3 100

!

interface ATM1/4

no ip address

no ATM ilmi-keepalive

ATM PVC 4 100  interface  ATM0/1 4 100

!

ip classless

!

end

Cisco 6400 NSP

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NSP

!

ip subnet-zero

!

atm address 47.0091.8100.0000.0030.8027.7501.0030.8027.7501.00

atm router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute atm-static

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

atm maxvp-number 0

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface ATM1/0/0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM2/0/0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM8/0/0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM8/0/1

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

atm pvc 3 100  interface  ATM1/0/0 3 100

atm pvc 4 100  interface  ATM1/0/0 4 100

!

ip classless

!

end

使用點對點介面的Cisco 6400-NRP

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NRP

!

username <username1> password <password1>

username <username2> password <password2>

!

redundancy

main-cpu

no auto-sync standard

no secondary console enable

ip subnet-zero

!

interface Loopback0

ip address 172.18.0.3 255.255.0.0

no ip directed-broadcast

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip route-cache

no atm ilmi-keepalive

!

interface ATM0/0/0.3 point-to-point

no ip directed-broadcast

pvc 3/100

encapsulation aal5mux ppp Virtual-Template1

!

!

interface ATM0/0/0.4 point-to-point

no ip directed-broadcast

pvc 4/100

encapsulation aal5mux ppp Virtual-Template1

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

interface Virtual-Template1

ip unnumbered Loopback0

no ip directed-broadcast

no peer default ip address

ppp authentication chap

!

ip classless

end

使用多點介面的Cisco 6400 NRP

NRP#

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NRP

!

username <username1> password <password1>

username <username2> password <password2>

!

redundancy

main-cpu

no auto-sync standard

no secondary console enable

ip subnet-zero

!

interface Loopback0

ip address 172.18.0.3 255.255.0.0

no ip directed-broadcast

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip route-cache

no atm ilmi-keepalive

!

interface ATM0/0/0.9 multipoint

no ip directed-broadcast

pvc 3/100

encapsulation aal5mux ppp Virtual-Template1

!

pvc 4/100

encapsulation aal5mux ppp Virtual-Template1

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

interface Virtual-Template1

ip unnumbered Loopback0

no ip directed-broadcast

no peer default ip address

ppp authentication chap

!

ip classless

!

end

驗證

目前沒有適用於此組態的驗證程序。

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- 配置Cisco 827路由器

- 思科6400軟體安裝指南

- Cisco DSL技術支援資訊

- 產品支援 — Cisco Systems

- 技術支援 - Cisco Systems