目錄

簡介

必要條件

需求

採用元件

慣例

背景資訊

設定

網路圖表

組態

驗證

疑難排解

相關資訊

簡介

本檔案將提供連線到思科6130數位使用者線路存取多工器(DSLAM)的思科827數位使用者線路(DSL)路由器的範例設定，該路由器終止於思科6400通用存取集中器(UAC)上。

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 採用IOS®軟體版本12.1(1)XB的思科827-4V使用者端裝置(CPE)。

- Cisco 6400 UAC-NRP IOS軟體版本12.1(1)DC1（外部DHCP伺服器）或12.2(2)B（IOS DHCP伺服器）。

- Cisco 6400 UAC-NSP IOS軟體版本12.0(4)DB。

- Cisco 6130 DSLAM-NI2 IOS軟體版本12.1(1)DA。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

背景資訊

Cisco 827配置有RFC1483橋接和整合路由和橋接(IRB)。Cisco 827允許乙太網段上的PC從6400後面的DHCP伺服器或6400 IOS DHCP伺服器獲取地址。此外，還將BVI地址配置為從DHCP伺服器獲取地址和預設路由。Cisco 6400非同步傳輸模式(ATM)介面設定為路由橋接封裝(RBE)，並設定為與外部DHCP伺服器或NRP上的IOS DHCP伺服器協同運作。

對於Cisco 6400,Cisco 6400節點路由處理器(NRP)上的ATM RBE功能通過橋接RFC1483乙太網流量從末節橋接LAN路由IP。在路由橋接模式下設定的ATM介面上接收的橋接IP封包會透過IP標頭路由。這些介面利用了常用於DSL訪問的末節LAN拓撲的特性，提供了比IRB更高的效能和靈活性。

此外，DHCP客戶端的主機路由會在分配IP地址時自動新增到6400路由表中。釋放DHCP地址時，會從路由表中刪除主機路由。

設定

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

網路圖表

本文使用圖1和圖2所示的網路設定：

圖1 — 場景1

圖2 — 場景2

組態

本檔案會使用以下設定：

- 思科827

- Cisco 6400 NRP

- 6400偵錯（對外部DHCP伺服器使用RBE）

- 6400調試（使用RBE和IOS DHCP伺服器）

思科827

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname R1

!

ip subnet-zero

!

bridge irb

!

interface Ethernet0

no ip address

bridge-group 1

!--- Because the Ethernet0 is bridged to the WAN interface, !--- PCs behind the ethernet0 can be setup as DHCP clients. !--- They get their addresses from the DHCP server behind the 6400, !--- or from the IOS DHCP server on the 6400.

!

interface ATM0

no ip address

no ip directed-broadcast

no ip mroute-cache

no atm ilmi-keepalive

pvc 4/100

encapsulation aal5snap

!

bundle-enable

bridge-group 1

hold-queue 224 in

!

interface BVI1

ip address dhcp client-id Ethernet0

!--- This command tells the BVI interface to get the address !--- from DHCP, and also to get the default route from DHCP.

!

ip classless

!--- Note: The default route will be inserted into !--- the routing table automatically from the DHCP server, and !--- no static routing statement is required.

no ip http server

!

bridge 1 protocol ieee

bridge 1 route ip

!

voice-port 1

timing hookflash-in 0

!

voice-port 2

timing hookflash-in 0

!

voice-port 3

timing hookflash-in 0

!

voice-port 4

timing hookflash-in 0

!

end

Cisco 6400 NRP

Current configuration:

!

version 12.1

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NRP

!

redundancy

main-cpu

no auto-sync standard

no secondary console enable

ip subnet-zero

!

interface Loopback1

ip address 198.1.1.1 255.255.255.0

no ip directed-broadcast

!--- This address and mask must match the intended !--- scope and network configured on the external DHCP server.

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip mroute-cache

no ATM ilmi-keepalive

!

interface ATM0/0/0.4 point-to-point

!--- The interface ATM0/0/0.4 point-to-point uses IP !--- unnumbered Loopback1 for its IP address requirements.

ip unnumbered Loopback1

ip helper-address <dhcp server ip address>

atm route-bridged ip

PVC 4/100

encapsulation aal5snap

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

ip classless

!--- Note: For every DHCP client that is relayed an address, !--- a host route will be automatically inserted in the routing !--- table, and no host route statement for a DHCP client is required.

end

6400偵錯（對外部DHCP伺服器使用RBE）

debug ip dhcp server events

Looks for existing binding. . .

00:10:56:  find_or_create(): Look for existing binding for:

00:10:56:  find_or_create(): dhcp->chaddr = 616EF9BC

00:10:56:  find_or_create(): dhcp->hlen = 6

00:10:56:  find_or_create(): dhcp->htype = 1

00:10:56:  find_or_create: address = 124.124.124.1

00:10:56:  find_or_create(): Creating new binding with data

00:10:56:  find_or_create(): dhcp->chaddr = 616EF9BC

00:10:56:  find_or_create(): dhcp->hlen = 6

00:10:56:  find_or_create(): dhcp->htype = 1

00:10:56:  find_or_create: address = 124.124.124.1

!--- Forwards DHCP DISCOVER packet from the client to the !--- external DHCP server.

00:10:56: DHCPD: Received DHCPDISCOVER on UNNUM-IF

00:10:56: DHCPD: Forwarding reply on un-numbered intf

!--- Forwards the DHCP OFFER packet from the external DHCP server !--- to the client.

00:10:56: DHCPD: Unnum: Received DHCPOFFER

00:10:56:  DHCPD: Server Address = 200.200.200.2

00:10:56:  DHCPD: Giaddr Address = 124.124.124.1

00:10:56:  find_or_create(): Look for existing binding for:

00:10:56:  find_or_create(): dhcp->chaddr = 616EF9BC

00:10:56:  find_or_create(): dhcp->hlen = 6

00:10:56:  find_or_create(): dhcp->htype = 1

00:10:56:  find_or_create: address = 124.124.124.1

!--- Forwards the DHCP REQUEST packet from the client to the external !--- DHCP server.

00:10:56: DHCPD: Received DHCPREQUEST on UNNUM-IF

00:10:56:  DHCPD: request_on_unnumif ():Real Server = 200.200.200.2

00:10:56: DHCPD: Forwarding reply on un-numbered intf

!--- Forwards the DHCP ACK packet from the DHCP server to the client.

00:10:56: DHCPD: Unnum: Received DHCPACK

00:10:56:  DHCPD: lease time = 86400

!--- Adds a dynamic host route to the client into the routing table.

00:10:56: DHCPD: dhcpd_lookup_route: host = 124.124.124.2

00:10:56: DHCPD: dhcpd_lookup_route: index = 126

00:10:56:  DHCPD: Adding new route to host 124.124.124.2

00:10:56: DHCPD: dhcpd_lookup_route: host = 124.124.124.2

00:10:56: DHCPD: dhcpd_lookup_route: index = 126

00:10:56: DHCPD: dhcpd_create_and_hash_route: host = 124.124.124.2

00:10:56: DHCPD: dhcpd_create_and_hash_route index = 126

00:10:56: DHCPD: dhcpd_add_route: lease = 86400

00:10:56:  DHCPD: Server ID saved in Binding = 200.200.200.2

00:10:56:  DHCPD: Server ID saved in Route block = 200.200.200.2

00:10:56:  DHCPD: Giaddr Address = 124.124.124.1

6400調試（使用RBE和IOS DHCP伺服器）

debug ip dhcp server events

Assigns an address to the client from the IOS DHCP server.

23:19:09: DHCPD: assigned IP address 124.124.124.3 to

client 0063.6973.636f.2d30.3030.302e.3063.3036.2e32.3339.342d.4256.31.

23:19:10:  DHCPD: lease time = 86400

Adds a dynamic host route to the client into the routing table.

23:19:10: DHCPD: dhcpd_lookup_route: host = 124.124.124.3

23:19:10: DHCPD: dhcpd_lookup_route: index = 127

23:19:10:  DHCPD: Adding new route to host 124.124.124.3

23:19:10: DHCPD: dhcpd_lookup_route: host = 124.124.124.3

23:19:10: DHCPD: dhcpd_lookup_route: index = 127

23:19:10: DHCPD: dhcpd_create_and_hash_route: host = 124.124.124.3

23:19:10: DHCPD: dhcpd_create_and_hash_route index = 127

23:19:10: DHCPD: dhcpd_add_route: lease = 86400

驗證

目前沒有適用於此組態的驗證程序。

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- 使用RFC1483橋接，在RBE模式下在Cisco 6400上配置Cisco 827路由器

- DSL產品支援頁面