目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

驗證

疑難排解

疑難排解指令

相關資訊

簡介

本檔案將提供動態多點VPN(DMVPN)的範例組態，使用具有開放最短路徑優先(OSPF)、網路位址轉譯(NAT)和Cisco IOS®防火牆的IPsec通用路由封裝(GRE)。

必要條件

需求

在可以建立多點GRE(mGRE)和IPsec隧道之前，必須使用crypto isakmp policy命令定義網際網路金鑰交換(IKE)策略。

註：使用Command Lookup Tool(僅供已註冊客戶使用)可獲取本節中使用的命令的詳細資訊。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 中心路由器上的Cisco IOS®軟體版本12.2(15)T1和分支路由器上的Cisco IOS軟體版本12.3(1.6)

- Cisco 3620作為中心路由器、2台Cisco 1720路由器和1台Cisco 3620路由器作為分支路由器

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

請參閱思科技術提示慣例以瞭解更多有關文件慣例的資訊。

設定

本節提供用於設定本文件中所述功能的資訊。

註：使用Command Lookup Tool(僅供已註冊客戶使用)可獲取本節中使用的命令的詳細資訊。

網路圖表

本檔案會使用此網路設定。

組態

本檔案會使用這些設定。

- 集線器 — 3620-B

- 輻條1 - 3620-A

- 分支2 - 1720-b

- 輻條3 - 1720-A

集線器 — 3620-B

W2N-6.16-3620-B#write terminal

Building configuration...

Current configuration : 2613 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname W2N-6.16-3620-B

!

logging queue-limit 100

!

memory-size iomem 10

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out ftp

ip inspect name in2out tftp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out http

ip inspect name in2out udp

ip audit po max-events 100

!

!

!

!--- Create an Internet Security Association and Key Management !--- Protocol (ISAKMP) policy for Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

crypto isakmp nat keepalive 20

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!

!

!

!

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.117.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied !--- to all the dynamically created GRE tunnels.

interface Tunnel1

description MULTI-POINT GRE TUNNEL for BRANCHES

bandwidth 1000

ip address 172.16.0.1 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp network-id 99

ip nhrp holdtime 300

no ip route-cache

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source FastEthernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outbound interface.

interface FastEthernet0/0

ip address 14.24.117.1 255.255.0.0

ip nat outside

ip access-group 100 in

ip inspect in2out out

no ip mroute-cache

duplex auto

speed auto

!

interface Serial0/0

no ip address

shutdown

clockrate 2000000

no fair-queue

!

interface FastEthernet0/1

no ip address

no ip mroute-cache

duplex auto

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

network 172.16.0.0 0.0.0.255 area 0

network 192.168.117.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface FastEthernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens other inbound access as needed.

access-list 100 permit udp any host 14.24.117.1 eq 500

access-list 100 premit esp any host 14.24.117.1

access-list 100 permit gre any host 14.24.117.1

access-list 100 deny ip any any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.117.0 0.0.0.255 192.168.118.0 0.0.0.255

access-list 110 deny   ip 192.168.117.0 0.0.0.255 192.168.116.0 0.0.0.255

access-list 110 deny   ip 192.168.117.0 0.0.0.255 192.168.120.0 0.0.0.255

access-list 110 permit ip 192.168.117.0 0.0.0.255 any

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

W2N-6.16-3620-B#

輻條1 - 3620-A

W2N-6.16-3620-A#write terminal

Building configuration...

Current configuration : 2678 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname W2N-6.16-3620-A

!

boot system flash slot0:c3620-ik9o3s7-mz.122-15.T1.bin

logging queue-limit 100

!

memory-size iomem 15

ip subnet-zero

!

!

ip cef

no ip domain lookup

!

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!

!

!

!

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

mta receive maximum-recipients 0

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.118.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied to !--- all the dynamically created GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.2 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip route-cache

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source Ethernet0/0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

!--- This is the outbound interface.

interface Ethernet0/0

ip address 14.24.118.1 255.255.0.0

ip nat outside

ip access-group 100 in

ip inspect in2out out

no ip mroute-cache

half-duplex

!

interface Ethernet0/1

no ip address

half-duplex

!

interface Ethernet0/2

no ip address

shutdown

half-duplex

!

interface Ethernet0/3

no ip address

shutdown

half-duplex

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

redistribute connected

network 172.16.0.0 0.0.0.255 area 0

network 192.168.118.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface Ethernet0/0 overload

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens inbound access as needed.

access-list 100 permit udp any host 14.24.118.1 eq 500

access-list 100 premit esp any host 14.24.118.1

access-list 100 permit gre any host 14.24.118.1

access-list 100 deny ip any any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.118.0 0.0.0.255 192.168.117.0 0.0.0.255

access-list 110 deny   ip 192.168.118.0 0.0.0.255 192.168.116.0 0.0.0.255

access-list 110 deny   ip 192.168.118.0 0.0.0.255 192.168.120.0 0.0.0.255

access-list 110 permit ip 192.168.118.0 0.0.0.255 any

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

call rsvp-sync

!

!

mgcp profile default

!

dial-peer cor custom

!

!

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

!

end

W2N-6.16-3620-A#

分支2 - 1720-b

1720-b#write terminal

Building configuration...

Current configuration : 2623 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 1720-b

!

logging queue-limit 100

enable password cisco

!

username 7206-B password 0 cisco

ip subnet-zero

!

!

no ip domain lookup

!

ip cef

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit po max-events 100

vpdn-group 1

request-dialin

protocol pppoe

!

!

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.116.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied to !--- all the dynamically created GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.3 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

no ip route-cache

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source Dialer1

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

half-duplex

!

interface FastEthernet0

no ip address

no ip mroute-cache

speed auto

pppoe enable

pppoe-client dial-pool-number 1

!

!--- This is the outbound interface.

interface Dialer1

ip address 2.2.2.10 255.255.255.0

ip inspect in2out out

ip access-group 100 in encapsulation ppp

dialer pool 1

dialer-group 1

ppp authentication pap chap callin

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

redistribute connected

network 172.16.0.0 0.0.0.255 area 0

network 192.168.116.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface Dialer1 overload

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 0.0.0.0 0.0.0.0 Dialer1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 premit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.116.0 0.0.0.255 192.168.117.0 0.0.0.255

access-list 110 deny   ip 192.168.116.0 0.0.0.255 192.168.118.0 0.0.0.255

access-list 110 deny   ip 192.168.116.0 0.0.0.255 192.168.120.0 0.0.0.255

access-list 110 permit ip 192.168.116.0 0.0.0.255 any

dialer-list 1 protocol ip permit

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

no scheduler allocate

end

1720-b#

輻條3 - 1720-A

W2N-6.16-1720-A#write terminal

Building configuration...

Current configuration : 2303 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname W2N-6.16-1720-A

!

logging queue-limit 100

!

memory-size iomem 25

ip subnet-zero

!

!

no ip domain lookup

!

ip cef

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name in2out rcmd

ip inspect name in2out tftp

ip inspect name in2out udp

ip inspect name in2out tcp timeout 43200

ip inspect name in2out realaudio

ip inspect name in2out vdolive

ip inspect name in2out netshow

ip audit notify log

ip audit po max-events 100

!

!

!

!

!--- Create an ISAKMP policy for !--- Phase 1 negotiations.

crypto isakmp policy 5

authentication pre-share

group 2

!--- Add dynamic pre-shared key.

crypto isakmp key dmvpnkey address 0.0.0.0 0.0.0.0

!

!

!--- Create the Phase 2 policy for actual data encryption.

crypto ipsec transform-set dmvpnset esp-3des esp-sha-hmac

!

!--- Create an IPsec profile to be applied dynamically !--- to the GRE over IPsec tunnels.

crypto ipsec profile dmvpnprof

set transform-set dmvpnset

!

!

!

!

!

!--- This is the inbound interface.

interface Loopback1

ip address 192.168.120.1 255.255.255.0

ip nat inside

!

!--- Create a GRE tunnel template to be applied to !--- all the dynamically created GRE tunnels.

interface Tunnel1

description HOST DYNAMIC TUNNEL

bandwidth 1000

ip address 172.16.0.4 255.255.255.0

no ip redirects

ip mtu 1416

ip nhrp authentication dmvpn

ip nhrp map multicast dynamic

ip nhrp map 172.16.0.1 14.24.117.1

ip nhrp map multicast 14.24.117.1

ip nhrp network-id 99

ip nhrp holdtime 300

ip nhrp nhs 172.16.0.1

ip ospf network broadcast

no ip mroute-cache

delay 1000

tunnel source FastEthernet0

tunnel mode gre multipoint

tunnel key 100000

tunnel protection ipsec profile dmvpnprof

!

interface Ethernet0

no ip address

no ip mroute-cache

half-duplex

!

!--- This is the outbound interface.

interface FastEthernet0

ip address 14.24.120.1 255.255.0.0

ip nat outside

ip inspect in2out out

ip access-group 100 in

no ip mroute-cache

speed auto

!

!--- Enable a routing protocol to send/receive dynamic !--- updates about the private networks.

router ospf 1

log-adjacency-changes

redistribute connected

network 172.16.0.0 0.0.0.255 area 0

network 192.168.120.0 0.0.0.255 area 0

!

!--- Except the private network traffic from the NAT process.

ip nat inside source route-map nonat interface FastEthernet0 overload

ip classless

ip route 0.0.0.0 0.0.0.0 14.24.1.1

ip route 2.0.0.0 255.0.0.0 14.24.121.1

no ip http server

no ip http secure-server

!

!

!

!--- Allow ISAKMP, ESP, and GRE traffic inbound. !--- Cisco IOS Firewall opens inbound access as needed.

access-list 100 permit udp any host 14.24.116.1 eq 500

access-list 100 premit esp any host 14.24.116.1

access-list 100 permit gre any host 14.24.116.1

access-list 100 deny ip any any

access-list 110 permit ip 192.168.120.0 0.0.0.255 any

!--- Except the private network traffic from the NAT process.

access-list 110 deny   ip 192.168.120.0 0.0.0.255 192.168.116.0 0.0.0.255

access-list 110 deny   ip 192.168.120.0 0.0.0.255 192.168.117.0 0.0.0.255

access-list 110 deny   ip 192.168.120.0 0.0.0.255 192.168.118.0 0.0.0.255

access-list 110 permit ip 192.168.120.0 0.0.0.255 any

!

!--- Except the private network traffic from the NAT process.

route-map nonat permit 10

match ip address 110

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

login

!

end

W2N-6.16-1720-A#

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

- show crypto isakmp sa — 顯示ISAKMP安全關聯(SA)的狀態。

- show crypto engine connections active — 顯示每個SA的加密/解密總數。

- show crypto ipsec sa — 顯示活動隧道的統計資訊。

- show ip route — 顯示路由表。

- show ip ospf neighbor — 按介面顯示OSPF鄰居資訊。

- show ip nhrp — 顯示IP下一跳解析協定(NHRP)快取，可選擇僅限於特定介面的動態或靜態快取條目。

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

疑難排解指令

註：發出debug指令之前，請先參閱有關Debug指令的重要資訊。

- debug crypto ipsec — 顯示IPsec事件。

- debug crypto isakmp — 顯示有關IKE事件的消息。

- debug crypto engine — 顯示來自加密引擎的資訊。

有關IPsec故障排除的其他資訊，請參閱IP安全故障排除 — 瞭解和使用debug命令。

相關資訊

- Cisco IOS防火牆配置故障排除

- DMVPN和Cisco IOS概述

- IPSec 協商/IKE 通訊協定

- 技術支援與文件 - Cisco Systems