目錄

簡介

面向終端的思科AMP Linux聯結器有哪些已知的AV不相容？

簡介

本檔案介紹適用於終端的AMP Linux聯結器上的防病毒(AV)不相容情況。

面向終端的思科AMP Linux聯結器有哪些已知的AV不相容？

已知干擾面向終端的AMP Linux聯結器的AV應用程式清單如下：

- RHEL/CentOS 6.x上的F-Secure Linux Security。

- Kaspersky Endpoint Security。

- McAfee VSE for Linux。

- McAfee Endpoint Security for Linux。

- RHEL/CentOS 6.x上的Sophos Server Security 9。

- Symantec Endpoint Protection。

- RHEL 7的炭黑。

- 趨勢科技DSA（深度安全代理）。

注意：可能會有其他應用程式或更新導致相容應用程式出現問題。請參閱使用手冊，特別是Linux一章以瞭解更多詳細資訊(https://docs.amp.cisco.com/en/A4E/AMP%20for%20Endpoints%20User%20Guide.pdf)。