目錄

簡介

必要條件

需求

採用元件

設定

網路圖表

流量

組態

交換機3850-1

交換機3850-2

ISE

驗證

參考資料

相關思科支援社群討論

簡介

本文檔介紹如何配置思科身份服務引擎(ISE)版本2.0在清單和揚聲器模式下支援TrustSec SGT交換協定(SXP)的功能並對其進行故障排除。

必要條件

需求

思科建議您瞭解以下主題：

- Cisco Catalyst交換器組態

- 身分識別服務引擎(ISE)和TrustSec服務

採用元件

本檔案中的資訊是根據以下軟體版本：

- Cisco Catalyst 3850交換器（含軟體IOS-XE 3.7.2及更新版本）

- Cisco ISE 2.0版及更高版本

設定

網路圖表

流量

- 3850-2是10.0.0.100的802.1x身份驗證器 — ISE返回安全組標籤(SGT)16(IT)以成功進行身份驗證

- 3850-2交換機學習請求方ip地址（ip裝置跟蹤），並使用SXP協定將對映資訊(IP-SGT)傳送到ISE

- 3850-1是10.0.0.1的802.1x身份驗證器 — ISE返回SGT標籤9（行銷）以成功進行身份驗證

- 3850-1從ISE接收SXP對映資訊（10.0.0.100是SGT 16），從ISE下載策略

- 從10.0.0.100傳送到10.0.0.1的流量由3850-2（未下載具體策略）轉發到3850-1，該策略的執行者將執行策略IT(16)->行銷(9)

請注意，交換機之間的鏈路不是cts link — 因此交換機上的所有遠端對映都是通過SXP協定安裝的。

附註：並非所有交換機都有允許根據收到的SXP對映通過ISE接收的策略進行程式設計的硬體。有關驗證，請始終參閱最新的TrustSec相容性表或與Cisco Systems聯絡。

組態

有關基本TrustSec配置的詳細資訊，請參閱參考部分中的文章。

交換機3850-1

交換機通過SGT分配終止802.1x會話，並作為SXP揚聲器向ISE傳送。

aaa authentication dot1x default group ISE_mgarcarz

aaa authorization network default group ISE_mgarcarz

aaa authorization network ISE_mgarcarz group ISE_mgarcarz

aaa accounting dot1x default start-stop group ISE_mgarcarz

aaa accounting update newinfo

radius server ISE_mgarcarz

address ipv4 10.48.17.235 auth-port 1645 acct-port 1646

pac key cisco

aaa group server radius ISE_mgarcarz

server name ISE_mgarcarz

interface GigabitEthernet1/0/3

switchport mode trunk

interface GigabitEthernet1/0/5

description mgarcarz

switchport access vlan 100

switchport mode access

ip flow monitor F_MON input

ip flow monitor F_MON output

authentication order dot1x mab

authentication priority dot1x mab

authentication port-control auto

mab

dot1x pae authenticator

cts authorization list ISE_mgarcarz

cts role-based enforcement

cts role-based enforcement vlan-list 1-4094

cts sxp enable

cts sxp default password cisco

cts sxp connection peer 10.48.17.235 password default mode local listener hold-time 0

交換機3850-2

交換機通過SGT分配終止802.1x會話，同時作為SXP偵聽器從ISE獲取對映。

aaa authentication dot1x default group ISE_mgarcarz

aaa authorization network default group ISE_mgarcarz

aaa authorization network ISE_mgarcarz group ISE_mgarcarz

aaa accounting dot1x default start-stop group ISE_mgarcarz

aaa accounting update newinfo

radius server ISE_mgarcarz

address ipv4 10.48.17.235 auth-port 1645 acct-port 1646

pac key cisco

aaa group server radius ISE_mgarcarz

server name ISE_mgarcarz

interface GigabitEthernet1/0/3

switchport mode trunk

interface GigabitEthernet1/0/5

description mgarcarz

switchport access vlan 100

switchport mode access

authentication order dot1x mab

authentication priority dot1x mab

authentication port-control auto

mab

dot1x pae authenticator

cts authorization list ISE_mgarcarz

cts role-based enforcement

cts role-based enforcement vlan-list 1-4094

cts sxp enable

cts sxp default password cisco

cts sxp connection peer 10.48.17.235 password default mode local speaker hold-time 0

ISE

步驟1.  網路存取裝置

導航至工作中心(Work Centers)>裝置管理(Device Administration)>網路資源(Network Resources)，新增兩台具有共用金鑰cisco和TrustSec密碼Krakow123的交換機。

步驟2.安全組

若要新增面向IT和市場行銷的SGT，請導航至工作中心> TrustSec >元件>安全組。

步驟3.  安全組ACL

要新增安全組ACL，請導航到工作中心> TrustSec >元件>安全組ACL。

僅允許ICMP流量。

步驟4. TrustSec策略

若要新增控制從IT到Marketing的流量的策略，請導航到Work Centers > TrustSec > Components > Egress Policy > Matrix。

設定預設條目catch all規則以拒絕所有流量。

步驟5. SXP裝置

要為相應的交換機配置SXP監聽器和揚聲器，請導航至工作中心> TrustSec > SXP裝置。

使用口令cisco（或在交換機上為sxp配置的任何其它口令）。

步驟6.授權策略

確保授權策略為每個使用者返回正確的SGT標籤，導航至Policy > Authorization。

驗證

步驟1.交換機加入CTS的ISE

從每台交換機提供TrustSec憑證（在ISE/Step1中配置）以獲取PAC。

KSEC-3850-2#cts credentials id KSEC-3850-2 password Krakow123

CTS device ID and password have been inserted in the local keystore. Please make sure that the same ID and password are configured in the server database.

確保已下載PAC。

KSEC-3850-2#show cts pacs

AID: 65D55BAF222BBC73362A7810A04A005B

PAC-Info:

PAC-type = Cisco Trustsec

AID: 65D55BAF222BBC73362A7810A04A005B

I-ID: KSEC-3850-2

A-ID-Info: Identity Services Engine

Credential Lifetime: 20:42:37 UTC Nov 13 2015

PAC-Opaque: 000200B8000300010004001065D55BAF222BBC73362A7810A04A005B0006009C00030100B26D8DDC125B6595067D64F917DA624C0000001355CB2E1C00093A800E567155E0DE76419D2F3B97D890F34F109C4C42F586B29050CEC7B441E0CA60FC6684D4F6E8263FA2623A6E450927815A140CD3B9D68988E95D8C1E65544E222E187C647B9F7F3F230F6DB4F80F3C201ACD623B309077E27688EDF7704740A1CD3F18CE8485788054C19909083ED303BB49A6975AC0395D41E1227B

Refresh timer is set for 12w4d

並刷新環境策略。

KSEC-3850-2#show cts environment-data

CTS Environment Data

====================

Current state = COMPLETE

Last status = Successful

Local Device SGT:

SGT tag = 0-00:Unknown

Server List Info:

Installed list: CTSServerList1-0001, 1 server(s):

*Server: 10.48.17.235, port 1812, A-ID 65D55BAF222BBC73362A7810A04A005B

Status = ALIVE

auto-test = FALSE, keywrap-enable = FALSE, idle-time = 60 mins, deadtime = 20 secs

Multicast Group SGT Table:

Security Group Name Table:

0-00:Unknown

6-00:SGT_Guest

9-00:SGT_Marketing

15-00:SGT_BYOD

16-00:SGT_IT

255-00:SGT_Quarantine

Environment Data Lifetime = 86400 secs

Last update time = 20:47:04 UTC Sat Aug 15 2015

Env-data expires in   0:08:09:13 (dd:hr:mm:sec)

Env-data refreshes in 0:08:09:13 (dd:hr:mm:sec)

Cache data applied           = NONE

State Machine is running

對3850-1重複相同的過程

步驟2. 802.1x會話

IT使用者通過身份驗證後，將分配正確的標籤。

KSEC-3850-2#show authentication sessions interface g1/0/5 details

Interface:  GigabitEthernet1/0/5

IIF-ID:  0x107E700000000C4

MAC Address:  0050.b611.ed31

IPv6 Address:  Unknown

IPv4 Address:  10.0.0.100

User-Name:  cisco

Status:  Authorized

Domain:  DATA

Oper host mode:  single-host

Oper control dir:  both

Session timeout:  N/A

Common Session ID:  0A3E946D00000FF214D18E36

Acct Session ID:  0x00000FDC

Handle:  0xA4000020

Current Policy:  POLICY_Gi1/0/5

Local Policies:

Service Template: DEFAULT_LINKSEC_POLICY_SHOULD_SECURE (priority 150)

Security Policy:  Should Secure

Security Status:  Link Unsecure

Server Policies:

SGT Value:  16

Method status list:

Method           State

dot1x            Authc Success

對映將安裝在本地SGT-IP表中。

KSEC-3850-2#show cts role-based sgt-map all

Active IPv4-SGT Bindings Information

IP Address              SGT     Source

============================================

10.0.0.100              16      LOCAL

步驟3. SXP揚聲器

3850-2將對映傳送到ISE，交換機調試用於cts sxp。

KSEC-3850-2(config)#do show debug

CTS:

CTS SXP message debugging is on

*Aug 16 12:48:30.173: CTS-SXP-MSG:trp_send_msg <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.173: CTS-SXP-MSG:trp_socket_write fd<1>, cdbp->ph_sock_pending<1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.226: CTS-SXP-MSG:trp_process_read_sock <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.226: CTS-SXP-MSG:trp_process_read_sock socket_recv result:-1 errno:11; <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.226: CTS-SXP-MSG:trp_process_read_sock socket_conn is accepted; <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.226: CTS-SXP-MSG:trp_socket_write fd<1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.226: CTS-SXP-MSG:trp_socket_write freeing tx_msgq_entry, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.227: CTS-SXP-MSG:after socket_send, wlen=28, slen=0, tot_len=28, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.227: CTS-SXP-MSG:trp_socket_write freeing tx_buf, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.227: CTS-SXP-MSG:trp_socket_read <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.227: CTS-SXP-MSG:trp_socket_read readlen = -1; errno = 11, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.278: CTS-SXP-MSG:trp_process_read_sock <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.278: CTS-SXP-MSG:trp_socket_read <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.278: CTS-SXP-MSG:RCVD peer 10.48.17.235 readlen:32, datalen:0 remain:4096 bufp =

*Aug 16 12:48:30.278: CTS-SXP-MSG:sxp_handle_rx_msg_v2 <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.279: CTS-SXP-MSG:imu_sxp_conn_cr <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.279: CTS-SXP-MSG:wrt_sxp_opcode_info_v4 cdbp 0x3D541160

*Aug 16 12:48:30.279: CTS-SXP-MSG:trp_send_msg <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.279: CTS-SXP-MSG:trp_socket_write fd<1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.279: CTS-SXP-MSG:trp_socket_write freeing tx_msgq_entry, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.279: CTS-SXP-MSG:after socket_send, wlen=28, slen=0, tot_len=28, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.279: CTS-SXP-MSG:trp_socket_write freeing tx_buf, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.280: CTS-SXP-MSG:trp_socket_read readlen = 32; errno = 11, <10.48.17.235, 10.62.148.109>

ISE報告(sxp_appserver/sxp.log)

2015-08-16 14:44:07,029 INFO  [nioEventLoopGroup-2-3] opendaylight.sxp.core.behavior.Strategy:473 - [ISE:10.48.17.235][10.48.17.235:21121/10.62.148.109:64999][O|Lv4/Sv4 192.168.77.2] PURGEALL processing

2015-08-16 14:44:07,029 WARN  [nioEventLoopGroup-2-3] opendaylight.sxp.core.handler.MessageDecoder:173 - [ISE:10.48.17.235][10.48.17.235:21121/10.62.148.109:64999] Channel inactivation

2015-08-16 14:44:07,029 INFO  [pool-3-thread-1] sxp.util.database.spi.MasterDatabaseProvider:721 - SXP_PERF:BINDINGS_PER_SXP_UPDATE_MESSAGE(CHUNK)=1, onlyChanged=true

2015-08-16 14:44:07,030 INFO  [pool-3-thread-1] sxp.util.database.spi.MasterDatabaseProvider:725 - SXP_PERF:NUM_OF_CHUNKS=1, onlyChanged=true

2015-08-16 14:44:07,030 INFO  [pool-3-thread-9] opendaylight.sxp.core.service.UpdateExportTask:93 - SXP_PERF:SEND_UPDATE_BUFFER_SIZE=16

2015-08-16 14:44:07,030 INFO  [pool-3-thread-9] opendaylight.sxp.core.service.UpdateExportTask:119 - SENT_UPDATE to [ISE:10.48.17.235][10.48.17.235:57719/10.62.148.108:64999][O|Sv4]

2015-08-16 14:44:07,030 INFO  [pool-3-thread-9] opendaylight.sxp.core.service.UpdateExportTask:140 - SENT_UPDATE SUCCESSFUL to [ISE:10.48.17.235][10.48.17.235:57719/10.62.148.108:64999][O|Sv4]:false

2015-08-16 14:44:07,030 INFO  [pool-3-thread-1] opendaylight.sxp.core.service.BindingDispatcher:198 - SXP_PERF:MDB_PARTITON_AND_SXP_DISPATCH:DURATION=1 milliseconds, NUM_CONNECTIONS=1

2015-08-16 14:44:07,031 INFO  [pool-3-thread-1] sxp.util.database.spi.MasterDatabaseProvider:725 - SXP_PERF:NUM_OF_CHUNKS=0, onlyChanged=true

2015-08-16 14:44:12,534 INFO  [nioEventLoopGroup-2-4] opendaylight.sxp.core.behavior.Strategy:232 - [ISE:10.48.17.235][10.48.17.235:64999/10.62.148.109:1035][X|Lv4/Sv4 192.168.77.2] received Message  Open

2015-08-16 14:44:12,535 INFO  [nioEventLoopGroup-2-4] opendaylight.sxp.core.behavior.Strategy:358 - [ISE:10.48.17.235][10.48.17.235:64999/10.62.148.109:1035][O|Lv4/Sv4 192.168.77.2] Sent RESP 0 0 0 32 0 0 0 2 | 0 0 0 4 0 0 0 2 80 6 6 3 0 2 0 1 0 80 7 4 0 120 0 180

2015-08-16 14:44:12,585 INFO  [nioEventLoopGroup-2-4] opendaylight.sxp.core.behavior.Strategy:451 - [ISE:10.48.17.235][10.48.17.235:64999/10.62.148.109:1035][O|Lv4/Sv4 192.168.77.2] received Message  Update

2015-08-16 14:44:12,586 INFO  [pool-3-thread-2] opendaylight.sxp.core.service.SimpleBindingHandler:663 - PERF_SXP_PROCESS_UPDATE from [ISE:10.48.17.235][10.48.17.235:64999/10.62.148.109:1035][O|Lv4/Sv4 192.168.77.2]

2015-08-16 14:44:12,586 INFO  [pool-3-thread-2] opendaylight.sxp.core.service.SimpleBindingHandler:666 - PERF_SXP_PROCESS_UPDATE_DONE from [ISE:10.48.17.235][10.48.17.235:64999/10.62.148.109:1035][O|Lv4/Sv4 192.168.77.2]

2015-08-16 14:44:12,586 INFO  [pool-3-thread-1] sxp.util.database.spi.MasterDatabaseProvider:721 - SXP_PERF:BINDINGS_PER_SXP_UPDATE_MESSAGE(CHUNK)=1, onlyChanged=true

2015-08-16 14:44:12,587 INFO  [pool-3-thread-1] sxp.util.database.spi.MasterDatabaseProvider:725 - SXP_PERF:NUM_OF_CHUNKS=1, onlyChanged=true

2015-08-16 14:44:12,587 INFO  [pool-3-thread-11] opendaylight.sxp.core.service.UpdateExportTask:93 - SXP_PERF:SEND_UPDATE_BUFFER_SIZE=32

2015-08-16 14:44:12,587 INFO  [pool-3-thread-11] opendaylight.sxp.core.service.UpdateExportTask:119 - SENT_UPDATE to [ISE:10.48.17.235][10.48.17.235:57719/10.62.148.108:64999][O|Sv4]

2015-08-16 14:44:12,587 INFO  [pool-3-thread-11] opendaylight.sxp.core.service.UpdateExportTask:140 - SENT_UPDATE SUCCESSFUL to [ISE:10.48.17.235][10.48.17.235:57719/10.62.148.108:64999][O|Sv4]:false

2015-08-16 14:44:12,587 INFO  [pool-3-thread-1] opendaylight.sxp.core.service.BindingDispatcher:198 - SXP_PERF:MDB_PARTITON_AND_SXP_DISPATCH:DURATION=1 milliseconds, NUM_CONNECTIONS=1

並通過GUI顯示所有對映（包括從3850-2接收的10.0.0.100的對映），如下圖所示。

192.168.77.2是3850-2上SXP連線的識別符號（定義的最高ip地址）。

KSEC-3850-2#show ip interface brief

Interface              IP-Address      OK? Method Status                Protocol

GigabitEthernet0/0     unassigned      YES unset  down                  down

Vlan1                  unassigned      YES NVRAM  administratively down down

Vlan100                10.0.0.2        YES manual up                    up

Vlan480                10.62.148.109   YES NVRAM  up                    up

Vlan613                unassigned      YES NVRAM  administratively down down

Vlan666                192.168.66.2    YES NVRAM  down                  down

Vlan777                192.168.77.2    YES NVRAM  down                  down

步驟4. SXP偵聽程式

然後ISE將該對映重新傳送到3850-1，交換機調試。

*Aug 16 05:42:54.199: CTS-SXP-MSG:trp_send_msg <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.199: CTS-SXP-MSG:trp_socket_write fd<1>, cdbp->ph_sock_pending<1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.248: CTS-SXP-MSG:trp_process_read_sock <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.248: CTS-SXP-MSG:trp_process_read_sock socket_recv result:-1 errno:11; <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.248: CTS-SXP-MSG:trp_process_read_sock socket_conn is accepted; <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.248: CTS-SXP-MSG:trp_socket_write fd<1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.248: CTS-SXP-MSG:trp_socket_write freeing tx_msgq_entry, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.248: CTS-SXP-MSG:after socket_send, wlen=32, slen=0, tot_len=32, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.248: CTS-SXP-MSG:trp_socket_write freeing tx_buf, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.249: CTS-SXP-MSG:trp_socket_read <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.249: CTS-SXP-MSG:trp_socket_read readlen = -1; errno = 11, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.300: CTS-SXP-MSG:trp_process_read_sock <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.300: CTS-SXP-MSG:trp_socket_read <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.300: CTS-SXP-MSG:RCVD peer 10.48.17.235 readlen:28, datalen:0 remain:4096 bufp =

*Aug 16 05:42:54.301: CTS-SXP-MSG:sxp_handle_rx_msg_v2 <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.301: CTS-SXP-MSG:imu_sxp_conn_cr ci<1> cdbp->ph_conn_state<2>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.301: CTS-SXP-MSG:trp_socket_read readlen = 28; errno = 11, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.301: CTS-SXP-MSG:trp_process_read_sock <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:trp_socket_read <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:RCVD peer 10.48.17.235 readlen:52, datalen:0 remain:4096 bufp =

*Aug 16 05:42:54.302: CTS-SXP-MSG:sxp_handle_rx_msg_v2 <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:sxp_recv_update_v4 <1> peer ip: 10.48.17.235

*Aug 16 05:42:54.302: CTS-SXP-MSG:1. msg type:3, total len:52,  payl len:44, opc_ptr:0x3DFC7308, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:1. msg type:3, total len:52,  payl len:37, opc_ptr:0x3DFC730F, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:1. msg type:3, total len:52,  payl len:32, opc_ptr:0x3DFC7314, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:1. msg type:3, total len:52,  payl len:24, opc_ptr:0x3DFC731C, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:1. msg type:3, total len:52,  payl len:13, opc_ptr:0x3DFC7327, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:1. msg type:3, total len:52,  payl len:8, opc_ptr:0x3DFC732C, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.303: CTS-SXP-MSG:1. msg type:3, total len:52,  payl len:0, opc_ptr:0x3DFC7334, <10.48.17.235, 10.62.148.108>

從ISE獲取的資料包捕獲流量指向3850-1確認正在傳送SXP對映。

Wireshark使用標準SMPP解碼器。檢查負載：

「c0 a8 01 cb」(192.168.1.203)為10(SGT = 16)

10(SGT = 16)表示「0a 00 00 64」(10.0.0.100)

3850-1安裝從ISE接收的所有對映。

KSEC-3850-1# show cts sxp sgt-map

SXP Node ID(generated):0xC0A84D01(192.168.77.1)

IP-SGT Mappings as follows:

IPv4,SGT: <10.0.0.100 , 16:SGT_IT>

source  : SXP;

Peer IP : 10.48.17.235;

Ins Num : 2;

Status  : Active;

Seq Num : 439

Peer Seq: 0A3011EB,C0A84D02,

IPv4,SGT: <192.168.1.203 , 16:SGT_IT>

source  : SXP;

Peer IP : 10.48.17.235;

Ins Num : 6;

Status  : Active;

Seq Num : 21

Peer Seq: 0A3011EB,

Total number of IP-SGT Mappings: 2

KSEC-3850-1# show cts role-based sgt-map all

Active IPv4-SGT Bindings Information

IP Address              SGT     Source

============================================

10.0.0.100              16      SXP

192.168.1.203           16      SXP

IP-SGT Active Bindings Summary

============================================

Total number of CLI      bindings = 1

Total number of SXP      bindings = 2

Total number of active   bindings = 3

步驟5.政策下載和執行

從ISE下載正確的策略。（使用SGT 16的矩陣行）

KSEC-3850-1#show cts role-based permissions

IPv4 Role-based permissions default:

Permit IP-00

IPv4 Role-based permissions from group 16:SGT_IT to group 9:SGT_Marketing:

ICMP-10

Deny IP-00

RBACL Monitor All for Dynamic Policies : FALSE

RBACL Monitor All for Configured Policies : FALSE

允許從10.0.0.100(SGT IT)到10.0.0.1(SGT Marketing)的ICMP流量，計數器增加。

KSEC-3850-1#show cts role-based counters from 16

Role-based IPv4 counters

#Hardware counters are not available for specific SGT/DGT

#Use this command without arguments to see hardware counters

From    To      SW-Denied       SW-Permitted

16      9       0               0               11              0

當嘗試使用telnet連線失敗時，丟棄計數器增加。

KSEC-3850-1#show cts role-based counters from 16

Role-based IPv4 counters

#Hardware counters are not available for specific SGT/DGT

#Use this command without arguments to see hardware counters

From    To      SW-Denied       SW-Permitted

16      9       3               0               11              0

請注意，3850-2沒有特定策略，允許所有流量。

KSEC-3850-2#show cts role-based permissions

IPv4 Role-based permissions default:

Permit IP-00

RBACL Monitor All for Dynamic Policies : FALSE

RBACL Monitor All for Configured Policies : FALSE

在ISE上修改SG ACL後，在3850-1上新增permit tcp和cts刷新策略 — 然後接受telnet流量。

也可以使用Flexible Netflow（從IOS-XE 3.7.2開始，它具有SGT感知）本地快取來確認行為。

flow record cts-v4

match ipv4 protocol

match ipv4 source address

match ipv4 destination address

match transport source-port

match transport destination-port

match flow direction

match flow cts source group-tag

match flow cts destination group-tag

collect counter packets long

flow monitor F_MON

record cts-v4

interface GigabitEthernet1/0/3

ip flow monitor F_MON input

ip flow monitor F_MON output

結果顯示從3850-2接收的流量。源SGT為0，因為接收的流量沒有任何SGT（無cts連結），但根據本地對映表自動替換目標組標籤。

KSEC-3850-1#show flow monitor F_MON cache

Cache type:                               Normal (Platform cache)

Cache size:                              Unknown

Current entries:                               6

Flows added:                                1978

Flows aged:                                 1972

- Active timeout      (  1800 secs)         30

- Inactive timeout    (    15 secs)       1942

IPV4 SRC ADDR    IPV4 DST ADDR    TRNS SRC PORT  TRNS DST PORT  FLOW DIRN  FLOW CTS SRC GROUP TAG  FLOW CTS DST GROUP TAG  IP PROT             pkts long

===============  ===============  =============  =============  =========  ======================  ======================  =======  ====================

150.1.7.1        224.0.0.10                   0              0  Output                          0                       0       88                    57

10.62.148.1      224.0.0.13                   0           8192  Output                          0                       0      103                     0

7.7.4.1          224.0.0.10                   0              0  Output                          0                       0       88                    56

10.0.0.1         10.0.0.100                   0              0  Output                          0                       0        1                  1388

150.1.7.105      224.0.0.5                    0              0  Output                          0                       0       89                    24

150.1.7.1        224.0.0.5                    0              0  Output                          0                       0       89                    24

10.0.0.100       10.0.0.1                     0           2048  Input                           0                       9        1                  1388

Netflow本地快取可用於確認收到的流量。如果流量被接受或丟棄，則這一點由之前出現的cts計數器確認。

ISE還允許生成SXP繫結和連線報告，如下圖所示。

參考資料

- 採用ISE的ASA 9.2.1版VPN安全評估配置示例

- ASA和Catalyst 3750X系列交換機TrustSec配置示例和故障排除指南

- Cisco TrustSec交換機配置指南：瞭解Cisco TrustSec

- Cisco TrustSec部署和路線圖

- Cisco Catalyst 3850 TrustSec配置指南

- Cisco TrustSec相容性矩陣

- 技術支援與文件 - Cisco Systems