目錄

簡介

開始之前

慣例

必要條件

採用元件

使用shutdown指令

使用Windows NT關機使用者介面

相關資訊

簡介

本文說明如何使用shutdown命令或Windows NT關閉使用者介面關閉或重新啟動運行Microsoft Windows NT的Cisco Intelligent Contact Management(ICM)遠端系統。

注意：只有在思科技術支援中心(TAC)工程師的指示或思科ICM技術提示的指示下，您才應遵循此程式。

開始之前

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

必要條件

本文檔的讀者應瞭解以下內容：

- Cisco ICM

- Microsoft Windows網路

採用元件

本檔案中的資訊是根據以下軟體和硬體版本。

- Cisco ICM的所有版本

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您在即時網路中工作，請確保在使用任何命令之前瞭解其潛在影響。

使用shutdown指令

您可以在Telnet會話中使用shutdown命令關閉Cisco ICM遠端系統。

註：在計畫維護視窗期間使用shutdown命令。

以下輸出說明shutdown命令可用的選項。

C:\>shutdown /?

Usage: SHUTDOWN [machine] [/M:message] [/D:delay] [/Force] [/Reboot] [/Cancel]

------------------------------------------------------------------------------

where:  machine is the network name of the computer to shutdown

message is displayed in the shutdown dialog

delay is the amount of time to wait before shutting down

/Force  Forcibly closes all applications

/Reboot Restarts the machine immediately after shutdown

/Cancel Cancels an existing shutdown order

在以下示例中，shutdown命令將關閉並重新啟動名為「geociscolgra」的電腦。

C:\>shutdown \\geociscolgra /force /reboot

使用Windows NT關機使用者介面

要使用Microsoft Windows NT Shutdown使用者介面重新啟動電腦，請按一下Start > Shut Down > 重新啟動電腦。

相關資訊

- 技術支援 - Cisco Systems